Copyright: Copyright ® 1999 Synopsys, Inc.


Getting Support

For technical support, Altera provides several points of contact regarding FPGA Compiler II Altera Edition and FPGA Express.

E-Mail Support

Send e-mail to Altera Applications at

sos@altera.com

Telephone Support

Call Altera Applications at

1-800-800-EPLD (United States and Canada)

World Wide Web Site

As an FPGA Compiler II Altera Edition and FPGA Express customer, you have access to the Altera World Wide Web site at

http://www.altera.com

The Altera Web site offers technical and general information, including:

•	Automated assistance

•	Altera product descriptions and announcements

•	Descriptions of Altera training and support services

•	The Altera Technical Support (AtlasSM) database